From 6c1fb702e17b00fd7de72ac7dd4a31584d5978b9 Mon Sep 17 00:00:00 2001
From: sspenst <spencerspenst@gmail.com>
Date: Fri, 8 Jul 2016 14:51:44 -0700
Subject: Made gridDim and blockDim global variables so that they can be
 accessed from sst_impl

---
 src/cuda-sim/opcodes.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/cuda-sim/opcodes.def')

diff --git a/src/cuda-sim/opcodes.def b/src/cuda-sim/opcodes.def
index 0c0eda9..1af04ea 100644
--- a/src/cuda-sim/opcodes.def
+++ b/src/cuda-sim/opcodes.def
@@ -103,7 +103,7 @@ OP_DEF(SHR_OP,shr_impl,"shr",1,1)
 OP_DEF(SIN_OP,sin_impl,"sin",1,4)
 OP_DEF(SLCT_OP,slct_impl,"slct",1,1)
 OP_DEF(SQRT_OP,sqrt_impl,"sqrt",1,4)
-OP_DEF(SST_OP,sst_impl,"sst",1,1)
+OP_DEF(SST_OP,sst_impl,"sst",1,5)
 OP_DEF(SSY_OP,ssy_impl,"ssy",0,3)
 OP_DEF(ST_OP,st_impl,"st",0,5)
 OP_DEF(SUB_OP,sub_impl,"sub",1,1)
-- 
cgit v1.3

